hmmm... wondering how you look like. I go to the g...

hmmm... wondering how you look like. I go to the gym 4/5 times a week. I must have seen you.

My ideal weight is actually 68kg according to the JPMC medical checkup I did. I'm now 70-71kg. 3 more kg to lose and I'm the happiest men in the world.